The best results for various kernels are given in~\prettyref{tbl:res-kernels}. The optimization binary \verb|roofline_full_manpack| was used for these results. This is the binary with all optimizations and the intrinsics kernel enabled. The following parameters were used: \verb|roofline_full_manpack -s 150000000 -r 5|. One double array was therefore 1144.41 MB big -- clearly too big for the cache.

\begin{table}[h!]
  \centering
  \begin{tabular}{ll}
    \toprule
    Kernel          & Max. GFLOP/s \\
    \midrule
    simple16        & 0.9919       \\
    fma16           & 0.9891       \\
    simple8         & 123.4004     \\
    simple8fastmath & 8.7187       \\
    fma8            & 21.7866      \\
    fma8manpack     & 18.9066      \\
    \bottomrule
  \end{tabular}
  \caption{Results for various kernels}
  \label{tbl:res-kernels}
\end{table}

%%% Local Variables:
%%% mode: latex
%%% TeX-master: "../report"
%%% End:
